PB20130319bub.list Bubble Calculations

0 5 10 15 20 UT

0 5 10 15 20 RTGmax

0 100 200 300 400 500

Δ Vz max

0 50 100 150 200 250 300 350 gglon

10^5

10^6

10^7

10^8

10^9

10^{10}

10^{11}

10^{12}

SEmax